10^{18} 10^{19} 10^{20}

10^{16}

10^{17}

E [eV]

J× E2.61 [eV

1.61/m2 sr s]

GRB + Galactic (heavy) GRB No GZK HiRes Fly’s Eye Yakutsk

Fly’s Eye energy scale