2000 4000 6000 8000

100

10 1

0.1

0.01

Baseline (km)

N(νe -> νμ) / N(νe -> νμ)

sin^22θ_{13} = 0.004

|Δm^2_{32}| = 0.0035 eV ^2

Δm^2_{32} < 0

Δm^2_{32} > 0

|Δm^2_{21}| = 5 x 10^{-5} eV ^2