Run 14776

X-ray spectrum

0 2000

4000

6000

8000

10000

12000

14000

16000

800 825 850 875 900 925 950 975 1000_{keV}

counts

4f5/2 - 3d3/2

4f7/2 - 3d5/2

4f5/2 - 3d5/2