0 100 200 300 400 500 0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

Muon density s [ m ]

Total

In volume 2

In volume 1 tran[mm] long[mm] volume 1 15 150 volume 2 9.75 150