HstSpillTrg Entries 5333 Mean 0.03193 RMS 0.04862

-0.25 -0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0.25 0

200

400

600

800

1000

Entries 6915

Spill distribution of triggers (secs)