HstTriggerProcRunShort

Entries 8340 Mean 0.001483 RMS 0.001074

Seconds

0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

Number of events

0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

Entries 9453

Process time in run