0

0.5

1

1.5 2

2.5 3

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 28 response to scan

hScan0

Entries 43 Mean x -442.8 Mean y -764.3 RMS x 8.348 RMS y 8.994 Integral 43 0 0 0 0 43 0 0 0 0

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 28 response to scan

hScan1

Entries 6 Mean x -386.2 Mean y -766.5 RMS x 8.858 RMS y 6.265 Integral 6 0 0 0 0 6 0 0 0 0

0

0.5

1

1.5 2

2.5 3

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 28 response to scan

hScan2

Entries 27 Mean x -338.3 Mean y -764.5 RMS x 8.119 RMS y 8.77 Integral 27 0 0 0 0 27 0 0 0 0

0 20 40 60 80 100 120

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 29 response to scan

hScan3

Entries 2549 Mean x -442.3 Mean y -715 RMS x 8.293 RMS y 7.793 Integral 2549 0 0 0 0 2549 0 0 0 0

0 50 100 150 200 250 300

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 29 response to scan

hScan4

Entries 9607 Mean x -391.6 Mean y -713.8 RMS x 9.205 RMS y 9.069 Integral 9607 0 0 0 0 9607 0 0 0 0

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 29 response to scan

hScan5 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0 Integral 0 0 0 0 0 0 0 0 0 0

0 10 20 30 40 50 60 70 80 90

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 30 response to scan

hScan6

Entries 650 Mean x -444.5 Mean y -679.2 RMS x 10.5 RMS y 2.384 Integral 650 0 0 0 0 650 0 0 0 0

0

5

10

15

20

25

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 30 response to scan

hScan7

Entries 99 Mean x -393 Mean y -678.6 RMS x 8.498 RMS y 1.729 Integral 99 0 0 0 0 99 0 0 0 0

0 100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 30 response to scan

hScan8

Entries 27473 Mean x -345.4 Mean y -683.2 RMS x 13.47 RMS y 4.444 Integral 2.747e+04 0 0 0 0 27473 0 0 0 0