0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 28 response to scan

hScan0

Entries 134927 Mean x -395.2 Mean y -746.9 RMS x 43.49 RMS y 25.02 Integral 1.349e+05 0 0 0 0 134927 0 0 0 0

0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 28 response to scan

hScan1

Entries 125064 Mean x -395.2 Mean y -746.9 RMS x 43.49 RMS y 25.03 Integral 1.251e+05 0 0 0 0 125064 0 0 0 0

0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 28 response to scan

hScan2

Entries 142032 Mean x -395.2 Mean y -747 RMS x 43.51 RMS y 25.03 Integral 1.42e+05 0 0 0 0 142032 0 0 0 0

0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 29 response to scan

hScan3

Entries 139206 Mean x -395.2 Mean y -746.9 RMS x 43.49 RMS y 25.01 Integral 1.392e+05 0 0 0 0 139206 0 0 0 0

0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 29 response to scan

hScan4

Entries 136240 Mean x -395.3 Mean y -746.9 RMS x 43.47 RMS y 25.01 Integral 1.362e+05 0 0 0 0 136240 0 0 0 0

0 20 40 60 80 100 120 140 160 180 200 220

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 29 response to scan

hScan5

Entries 107093 Mean x -395.3 Mean y -746.9 RMS x 43.51 RMS y 25.02 Integral 1.071e+05 0 0 0 0 107093 0 0 0 0

0

50

100

150

200

250

300

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 30 response to scan

hScan6

Entries 151207 Mean x -395.3 Mean y -746.9 RMS x 43.51 RMS y 25.02 Integral 1.512e+05 0 0 0 0 151207 0 0 0 0

0

50

100

150

200

250

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 30 response to scan

hScan7

Entries 149620 Mean x -395.2 Mean y -746.9 RMS x 43.52 RMS y 25.03 Integral 1.496e+05 0 0 0 0 149620 0 0 0 0

0 20 40 60 80 100 120 140 160 180

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 30 response to scan

hScan8

Entries 89710 Mean x -395.2 Mean y -746.9 RMS x 43.5 RMS y 25.03 Integral 8.971e+04 0 0 0 0 89710 0 0 0 0