0 100 200 300 400 500 600 700 800 900

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 28 response to scan

hScan0

Entries 55900 Mean x -442.6 Mean y -763.5 RMS x 11.91 RMS y 11.53 Integral 5.59e+04 0 0 0 0 55900 0 0 0 0

0 100 200 300 400 500 600 700 800

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 28 response to scan

hScan1

Entries 34701 Mean x -390.5 Mean y -763.2 RMS x 10.69 RMS y 10.36 Integral 3.47e+04 0 0 0 0 34701 0 0 0 0

0 100 200 300 400 500 600 700 800 900

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 28 response to scan

hScan2

Entries 55074 Mean x -340.2 Mean y -763 RMS x 11.59 RMS y 11.95 Integral 5.507e+04 0 0 0 0 55074 0 0 0 0

0 100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 29 response to scan

hScan3

Entries 108210 Mean x -442.7 Mean y -713 RMS x 14.94 RMS y 15.15 Integral 1.082e+05 0 0 0 0 108210 0 0 0 0

0 100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 29 response to scan

hScan4

Entries 133805 Mean x -393.2 Mean y -711.8 RMS x 17.1 RMS y 16.29 Integral 1.338e+05 0 0 0 0 133805 0 0 0 0

0

1

2

3

4

5

6

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 29 response to scan

hScan5

Entries 31 Mean x -336.2 Mean y -711.2 RMS x 7.416 RMS y 8.428 Integral 31 0 0 0 0 31 0 0 0 0

0 100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 30 response to scan

hScan6

Entries 99821 Mean x -442.2 Mean y -664.7 RMS x 15.43 RMS y 14.28 Integral 9.982e+04 0 0 0 0 99821 0 0 0 0

0 100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 30 response to scan

hScan7

Entries 96728 Mean x -393.7 Mean y -663.3 RMS x 15.5 RMS y 13.09 Integral 9.673e+04 0 0 0 0 96728 0 0 0 0

100 200 300 400 500 600 700 800 900 1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 30 response to scan

hScan8

Entries 255512 Mean x -372.8 Mean y -692.1 RMS x 35.77 RMS y 35.8 Integral 2.555e+05 0 0 0 0 255512 0 0 0 0