0 50 100 150 200 250 300 350 400 450

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 28 response to scan

hScan0

Entries 9018 Mean x -441.6 Mean y -763.2 RMS x 8.95 RMS y 7.16 Integral 9018 0 0 0 0 9018 0 0 0 0

0 20 40 60 80 100 120 140 160

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 28 response to scan

hScan1

Entries 2520 Mean x -389.4 Mean y -763.7 RMS x 8.557 RMS y 6.362 Integral 2520 0 0 0 0 2520 0 0 0 0

0 50 100 150 200 250 300 350 400

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 28 response to scan

hScan2

Entries 7291 Mean x -338.1 Mean y -763.8 RMS x 9.002 RMS y 6.288 Integral 7291 0 0 0 0 7291 0 0 0 0

0 100 200 300 400 500 600 700 800 900

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 29 response to scan

hScan3

Entries 57293 Mean x -443.3 Mean y -713.8 RMS x 12.44 RMS y 10.54 Integral 5.729e+04 0 0 0 0 57293 0 0 0 0

0 100 200 300 400 500 600 700 800 900

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 29 response to scan

hScan4

Entries 76072 Mean x -392.9 Mean y -712.9 RMS x 13.87 RMS y 11.94 Integral 7.607e+04 0 0 0 0 76072 0 0 0 0

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 29 response to scan

hScan5 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0 Integral 0 0 0 0 0 0 0 0 0 0

0 100 200 300 400 500 600 700

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 59, 30 response to scan

hScan6

Entries 32022 Mean x -441.8 Mean y -665.1 RMS x 12.29 RMS y 10.75 Integral 3.202e+04 0 0 0 0 32022 0 0 0 0

0

100

200

300

400

500

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 60, 30 response to scan

hScan7

Entries 17523 Mean x -390.4 Mean y -664.7 RMS x 9.611 RMS y 8.616 Integral 1.752e+04 0 0 0 0 17523 0 0 0 0

0

200

400

600

800

1000

-460 -440 -420 -400 -380 -360 -340 -320

-780

-760

-740

-720

-700

-680

-660

-640

Pixel 61, 30 response to scan

hScan8

Entries 116669 Mean x -349.1 Mean y -672.5 RMS x 16.92 RMS y 14.76 Integral 1.167e+05 0 0 0 0 116669 0 0 0 0