HstTrgEventRunTime Entries 294 Mean 0.1499 RMS 0.0002009

0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2 0 20 40 60 80 100 120 140 160 Spill poll time in run (secs)

HstTrgEventRunTriggers Entries 294 Mean 500 RMS 0

0 100 200 300 400 500 600 700 800 900 1000 0

50

100

150

200

250

300 Number of triggers per spill in run

HstTrgEventRunPolls Entries 294 Mean 1181 RMS 6.739

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0

50

100

150

200

250

300 Number of polls per spill in run