HstTriggerPollRunTime

Entries 969859 Mean 0.0185 RMS 0.03116

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1

10 210

310

410

510

610 Entries 970787

Poll time in run