fracErr Entries 137851 Mean 0.2413 RMS 0.2716

| p σ| 0 0.5 1 1.5 2 2.5 3 3.5 4 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

ID

CC correct id μν

CC μν All background from