engfrac Entries 365116 Mean 0.9011 RMS 0.1294

Fraction of visible energy in candidate

0 0.2 0.4 0.6 0.8 1 0 0.02

0.04

0.06

0.08 0.1 0.12

engfrac in traj

CC events μν NC events

engfrac Entries 257073 Mean 0.6006 RMS 0.2098