trvar Entries 257073 Mean 1.305 RMS 2.483

Variance of energy deposit for candidate hits

0 2 4 6 8 10 12 14 16 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 energy variance along track

CC events μν NC events