energy (GeV) ν Reconstructed

0 5 10 15 20 25 30 35 40 momentum (GeV/c) μ Reconstructed

0

5

10

15

20

25

30 pID Entries 140559 Mean x 18.6 Mean y 10.77 RMS x 7.99 RMS y 7.211