energy (GeV) ν Reconstructed

0 5 10 15 20 25 30 momentum (GeV/c) μ Reconstructed

0

5

10

15

20

25

30 pnoID Entries 356 Mean x 18.63 Mean y 5.185 RMS x 7.531 RMS y 4.102