energy (GeV) ν Reconstructed

0 5 10 15 20 25 30 tQ

0 0.5 1 1.5 2 2.5 3 3.5 4 qtnoID Entries 688 Mean x 11.67 Mean y 0.1392 RMS x 6.672 RMS y 0.1096