energy (GeV) ν Reconstructed

0 5 10 15 20 25 30 energy (GeV) ν True

0

5

10

15

20

25

30 recchar4 Entries 132 Mean x 12.19 Mean y 9.335 RMS x 7.693 RMS y 6.706

mult + errlike