energy (GeV) ν Reconstructed

0 5 10 15 20 25 30 energy (GeV) ν True

0

5

10

15

20

25

30 recchar4 Entries 132 Mean x 8.559 Mean y 6.831 RMS x 6.14 RMS y 6.269

mult + errlike