[rad] -μθ 0 0.005 0.01 0.015 0.02 0.025

events

0 100 200 300 400 500 600 700 800 900 1000

Entries 1888 Mean 0.002242 RMS 0.0009728

Entries 25548 Mean 0.01678 RMS 0.005617

Entries 27436 Mean 0.01578 RMS 0.006556

eν + ^-μ→

+ e μν + X -μ→ + N μν all Bkgr fit cut < 100 MeV had E