*MeV] 2 [rad

-μ*E

2_- μθ 0 0.5 1 1.5 2 2.5 3

events

0 100 200 300 400 500 600 700 800 900 1000

Entries 1888 Mean 0.08661 RMS 0.06573

Entries 135110 Mean 1.607 RMS 0.8455

Entries 136998 Mean 1.351 RMS 0.9585

eν + ^-μ→

+ e μν + X -μ→ + N μν all Bkgr fit cut < 100 MeV had E