0.0 400. 800. 1200. 1600. 2000.

s (m)

Decay Ring MAD-X 3.04.60 29/09/10 06.32.26

0.0 20. 40. 60. 80. 100.

120.

140.

160.

180.

200.

βx (m), βy (m)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0

Dx (m)

β x β y Dx

0.0 400. 800. 1200. 1600. 2000.

s (m)

Decay Ring MAD-X 3.04.60 29/09/10 06.32.26

0.0 1. 2. 3. 4. 5. 6. 7. 8. 9. 10.

μx (rad/ 2π), μy (rad/ 2π)

μx μy